Entries 12366 Mean -0.007195 RMS 0.4002 Constant 2.4±

171.5 Mean 0.004209 ± -0.009261 Sigma 0.0032 ± 0.3647

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210 ± ±