Entries 120277 Mean -0.0004912 RMS 0.2819 Constant 10.7±

2476 Mean 0.000944 ± -0.002046 Sigma 0.0007 ± 0.2746

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310 ± ±