Entries 22860 Mean -0.02911 RMS 0.3787 Constant 3.2±

298.7 Mean 0.00314 ± -0.03245 Sigma 0.0024 ± 0.3615

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210 ± ±