Entries 3582816 Mean -7.118e-06 RMS 0.4037 Constant 4.806e+01 ± 7.287e+04 Mean 0.000219 ± -0.005038 Sigma 0.000± 0.387

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1 10 210 310 410 510_{Entries 3582816} ± ±