EM Barrel, MEDIUM gain Entries 120277 Mean 0.008819 RMS 0.8096 Constant 4.2±

1197 Mean 0.00234 ± 0.01202 Sigma 0.002±

0.795

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310^{EM Barrel, MEDIUM gain} ±