Entries 6105153 Mean 22.13 RMS 16.48

Cell Energy [GeV]

0 10 20 30 40 50 60 70 80 90 100

Cells/2GeV

410

510

610_{Entries 6105153}

Entries 4856566 Mean 15.48 RMS 7.649

Entries 1248587 Mean 49.35 RMS 14.89