Entries 17534 Mean 37.14 Mean y 1.691e-10 RMS 16.42 RMS y 0.2787

Energy [Gev]

0 50 100 150 200 250 300

Time [ns]

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0.0 0.1 0.2 0.3_{Entries 17534}

Time Energy profile for Medium Gain for EMBASlot11