Entries 120277 Mean -1.902e-09 RMS 0.2952 Constant 12.0±

3277 Mean 0.000844 ± -0.001236 Sigma 0.0006 ± 0.2903

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310 ± ±