Entries 120277 Mean 0.0002463 RMS 0.2844 Constant 12.5± 3441 Mean 0.000807 ± -0.001238 Sigma 0.0006 ± 0.2778

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310 ± ±