Entries 16 Mean 67.78 RMS 35.91 p0 0.267 ± 1.383 p1 0.0012 ± 0.2732

Cell Energy [GeV]

0 20 40 60 80 100 120 140 160 180 200

Timing Resolution [ns]

0.25

0.26

0.27

0.28

0.29

0.30

± ±