EM Barrel, HIGH gain Entries 3582816 Mean -0.5118 RMS 0.6705

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

0 5000

10000

15000

20000

25000

30000

35000

40000

45000

EM Barrel, MEDIUM gain Entries 120277 Mean 0.008819 RMS 0.8096