EM Barrel, HIGH gain

Entries 3582816 Mean -0.5118 RMS 0.6705 Constant 2.787e+01 ± 4.299e+04 Mean 0.0004±

-0.5124 Sigma 0.0002± 0.6629

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310

410 ±