HG, .27-.32 Efrac, Brown/Purple

Entries 37 Mean 24.06 RMS 10.78 p0 2.217 p1 0.2946

Cell Energy [GeV]

0 5 10 15 20 25 30 35 40 45 50

Timing Resolution [ns]

0.29

0.30

0.31

0.32

0.33

0.34

0.35

0.36

0.37