HG, Efrac>=0.32, LightGreen/Beige

Entries 37 Mean 26.21 RMS 10.8 p0 1.851 p1 0.2871

Cell Energy [GeV]

0 5 10 15 20 25 30 35 40 45 50

Timing Resolution [ns]

0.28

0.29

0.30

0.31

0.32

0.33

0.34_{HG, Efrac>=0.32, LightGreen/Beige}