High Gain E (Yellow/Beige) Entries 37 Mean 26.21 RMS 10.8 p0 0.073± 2.499 p1 0.0010 ± 0.2794

Cell Energy [GeV]

5 10 15 20 25 30 35 40 45

Timing Resolution [ns]

0.28

0.29

0.30

0.31

0.32

0.33

0.34

0.35

±