HG, 0-10 Npv, Black/Red Entries 39 Mean 23.59 RMS 11.52 p0 1.906 p1 0.3009

Cell Energy [GeV]

5 10 15 20 25 30 35 40 45

Timing Resolution [ns]

0.28

0.30

0.32

0.34

0.36

0.38

0.40

0.42

0.44

0.46 HG, 0-10 Npv, Black/Red

HG, 10-12 Npv, Blue/Green Entries 39 Mean 23.7 RMS 11.58 p0 1.914 p1 0.3006

HG, 12-14 Npv, Magenta/LightBlue

Entries 39 Mean 23.55 RMS 11.51 p0 1.915 p1 0.3001

HG, 14-16 Npv, Brown/Purple

Entries 39 Mean 23.65 RMS 11.56 p0 1.917 p1 0.3003

HG, Npv>16, LightGreen/Beige

Entries 39 Mean 23.66 RMS 11.58 p0 1.921 p1 0.3