MG, 0-10 Npv, Black/Red Entries 47 Mean 46.29 RMS 13.74 p0 2.667 p1 0.2772

Cell Energy [GeV]

20 30 40 50 60 70 80

Timing Resolution [ns]

0.24

0.25

0.26

0.27

0.28

0.29

0.30