MG, 10-12 Npv, Blue/Green Entries 47 Mean 46.49 RMS 14.12 p0 2.89 p1 0.2745

Cell Energy [GeV]

30 40 50 60 70

Timing Resolution [ns]

0.24

0.26

0.28

0.30

0.32

0.34_{MG, 10-12 Npv, Blue/Green}