High Gain A (Black/Red) Entries 34 Mean 21.06 RMS 10.1 p0 0.019± 2.708 p1 0.0007 ± 0.2605

Cell Energy [GeV]

0 5 10 15 20 25 30 35 40 45 50

Timing Resolution [ns]

0.25

0.30

0.35

0.40

0.45

±

High Gain B (Blue/Green) Entries 34 Mean 26.6 RMS 10.08 p0 0.037± 3.468 p1 0.0011 ± 0.2434 ±

High Gain C (Magenta/LightBlue) Entries 38 Mean 30.05 RMS 10.91 p0 0.042± 4.003 p1 0.0011 ± 0.2404 ±

High Gain D (Brown/Purple) Entries 36 Mean 31.87 RMS 10.17 p0 0.045± 3.931 p1 0.0009 ± 0.2565 ±