Entries 5907850 Mean 0.2076 RMS 0.06373

[Gev]

Cluster /E MaxCell E 0.0 0.1 0.2 0.3 0.4 0.5 0.6 0 50 100 150 200 250 300 350 310 × in End Cap

Cluster /E MaxCell

Histogram of E