High Gain B (Blue/Green) Entries 43 Mean 24.82 RMS 12.39 p0 0.030± 2.928 p1 0.0007 ± 0.2659

Cell Energy [GeV]

5 10 15 20 25 30 35 40 45 50

Timing Resolution [ns]

0.25

0.30

0.35

0.40

0.45^{High Gain B (Blue/Green)}

±