Medium Gain B (Blue/Green) Entries 128 Mean 68.26 RMS 36.85 p0 0.25± 5.19 p1 0.0023 ± 0.2482

Cell Energy [GeV]

40 60 80 100 120 140 160

Timing Resolution [ns]

0.240

0.245

0.250

0.255

0.260

0.265

0.270

0.275

0.280

0.285_{Medium Gain B (Blue/Green)}

±