Medium Gain C (Magenta/Light Blue)

Entries 127 Mean 62.18 RMS 31.01 p0 0.220± 4.942 p1 0.0020 ± 0.2499

Cell Energy [GeV]

40 60 80 100 120 140

Timing Resolution [ns]

0.240

0.245

0.250

0.255

0.260

0.265

0.270

0.275

0.280 Medium Gain C (Magenta/Light Blue)

±