Medium Gain A (Black/Red) Entries 101 Mean 55.09 RMS 25.11 p0 2.958 p1 0.2662

Cell Energy [GeV]

40 60 80 100 120

Timing Resolution [ns]

0.23

0.24

0.25

0.26

0.27

0.28

Medium Gain B (Blue/Green) Entries 105 Mean 60.78 RMS 27.91 p0 0.114± 4.272 p1 0.0011 ± 0.2518 ±

High Gain C (Magenta/Light Blue)

Entries 118 Mean 62.03 RMS 29.1 p0 0.276± 5.072 p1 0.002± 0.244

High Gain D (Brown/Purple) Entries 141 Mean 78.31 RMS 42.14 p0 0.143± 5.713 p1 0.0016 ± 0.2411 ±