High Gain A (Black/Red) Entries 115 Mean 54.88 RMS 23.84 p0 0.4± 5.2 p1 0.0035 ± 0.2486

Cell Energy [GeV]

30 40 50 60 70 80 90 100 110 120

Timing Resolution [ns]

0.24

0.25

0.26

0.27

0.28 ±