High Gain B (Blue/Green) Entries 110 Mean 50.41 RMS 18.84 p0 0.322± 5.421 p1 0.0032 ± 0.2461

Cell Energy [GeV]

30 40 50 60 70 80 90 100

Timing Resolution [ns]

0.240

0.245

0.250

0.255

0.260

0.265

0.270

0.275

0.280^{High Gain B (Blue/Green)} ±