Medium Gain A (Black/Red) Entries 115 Mean 60.19 RMS 29.13 p0 0.358± 5.139 p1 0.0032 ± 0.2491

Cell Energy [GeV]

40 60 80 100 120

Timing Resolution [ns]

0.24

0.25

0.26

0.27

0.28 ±

Medium Gain B (Blue/Green) Entries 128 Mean 68.26 RMS 36.85 p0 0.25± 5.19 p1 0.0023 ± 0.2482 ±

Medium Gain C (Magenta/Light Blue)

Entries 127 Mean 62.18 RMS 31.01 p0 0.220± 4.942 p1 0.0020 ± 0.2499 ± Medium Gain D (Brown/Purple) Entries 116 Mean 60.27 RMS 29.18 p0 0.278± 5.181 p1 0.0025 ± 0.2477 ±