High Gain, EMB Entries 1.875552e+07 Mean 7.061e-07 RMS 0.3557 Constant 1.234e+02 ± 4.255e+05 Mean 0.0000813 ± -0.0007781 Sigma 0.000± 0.351

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1 10 210 310 410 510 ± ±