Medium Gain, EMB Entries 673683 Mean -1.721e-05 RMS 0.2951 Constant 2.775e+01 ± 1.848e+04 Mean 0.0003578 ± -0.0008215 Sigma 0.0003± 0.2901

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10 210

310

410 ± ±