High Gain, EMEC Entries 5907850 Mean 2.482e-05 RMS 0.3168 Constant 7.981e+01 ± 1.537e+05 Mean 0.000126 ± -0.001184 Sigma 0.000± 0.306

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1 10 210 310 410 510^{High Gain, EMEC} ± ±