Medium Gain, EMEC Entries 5420219 Mean 7.729e-05 RMS 0.298 Constant 8.469e+01 ± 1.593e+05 Mean 0.0001168 ± -0.0005783 Sigma 0.000± 0.271

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1 10 210 310 410 510^{Medium Gain, EMEC} ± ±