Entries 15805 Mean 11.3 Mean y -9.233e-09 RMS 4.03 RMS y 0.3561

Energy [Gev]

5 10 15 20 25 30 35 40

Time [ns]

-0.4

-0.3

-0.2

-0.1

-0.0 0.1 0.2 0.3^{Entries 15805}

Time Energy profile for High Gain for EMBASlot11