All gains Entries 189433 Mean 22.97 RMS 17.46

Cell Energy [GeV]

0 10 20 30 40 50 60 70 80 90 100

Cells/2GeV

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

HIGH gain Entries 145638 Mean 15.58 RMS 7.522

MEDIUM gain Entries 43795 Mean 50.9 RMS 16.03