EM Barrel, High gain

Entries 109977 Mean -0.5742 RMS 0.7454

Time [ns]

-10-8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

0 200 400 600 800 1000

1200

EM Barrel, MEDIUM gain

Entries 8642 Mean -0.0843 RMS 0.8416