Entries 109977 Mean -0.002522 RMS 0.3949 Constant 9.5± 2443 Mean 0.001086 ± -0.007138 Sigma 0.0009 ± 0.3545

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310 ± ±