Entries 9222 Mean 0.01016 RMS 0.5505 Constant 1.8±

138.5 Mean 0.005548 ± 0.007394 Sigma 0.0041 ± 0.5202

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210 ± ±