EM Barrel, HIGH gain Entries 280700 Mean -0.7547 RMS 0.6274

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

0 500 1000

1500

2000

2500

3000

3500

EM Barrel, MEDIUM gain Entries 9222 Mean -0.2221 RMS 0.7785