timeHighAllBarrelASlots Entries 51274 Mean 0.0006399 RMS 0.5308 Constant 812.1 Mean -0.001311 Sigma 0.4995

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310