Entries 850014 Mean 0.02938 RMS 0.3649 Constant 2.635e+01 ± 1.905e+04 Mean 0.00039 ± 0.02731 Sigma 0.0003 ± 0.3539

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310

410 Entries 850014 ± ± ±