Entries 128623 Mean 0.02102 RMS 0.3478 Constant 10.6± 3007 Mean 0.00097 ± 0.02023 Sigma 0.0008 ± 0.3397

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310 ± ±