High Gain Zee (Blue/Green) Entries 37 Mean 22.52 RMS 10.91 p0 0.005± 1.913 p1 0.0003 ± 0.2954

Cell Energy [GeV]

0 10 20 30 40 50

Timing Resolution [ns]

0.25

0.30

0.35

0.40

0.45

0.50^{High Gain Zee (Blue/Green)} ±

High Gain (Black/Red) Entries 41 Mean 24.81 RMS 12.2 p0 0.002±

1.899 p1 0.0001 ± 0.2985 ±