Entries 422165 Mean 3.437e-05 RMS 0.2915 Constant 19.6±

8806 Mean 0.000522 ± -0.001849 Sigma 0.0004 ± 0.2881

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310

410_{Entries 422165}

± ±