Entries 74343 Mean -0.02642 RMS 0.3098 Constant 7.3± 1280 Mean 0.00141 ± -0.02787 Sigma 0.0011± 0.3063

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1

10

210

310 Entries 74343 ±