timeHighAllBarrelASlots Entries 1.292238e+07 Mean 0.001973 RMS 0.3577 Constant 1.030e+02 ± 2.928e+05 Mean 0.0000994 ± 0.0002662 Sigma 0.0001± 0.3509

Time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10

Entries/20 ps

1 10 210 310 410 510^{timeHighAllBarrelASlots} ± ±