Medium Gain Zee (Blue)

Entries 14 Mean 57.02 RMS 24.07

Cell Energy [GeV]

0 50 100 150 200 250

Timing Resolution [ns]

0.26

0.27

0.28

0.29

0.30

0.31

0.32

Medium Gain (Black/Red) Entries 17 Mean 73.62 RMS 43.94 p0 0.182± 3.869 p1 0.0011 ± 0.2815 ±