cellTimeMediumEMBASlot12 Entries 2888 Mean 0.01667 RMS 0.8176 Underflow 0 Overflow 3 / ndf

2χ 8.104 / 7 Constant 8.0±

261.9 Mean 0.03583 ± 0.01889 Sigma 0.0656 ± 0.9445

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 50 100 150 200 250

± ±