cellTimeMediumEMBCSlot11 Entries 1948 Mean 0.06194 RMS 0.805 Underflow 0 Overflow 0 / ndf

2χ 13.17 / 7 Constant 6.3±

186.5 Mean 0.0517 ± -0.1267 Sigma 0.0383 ± 0.6992

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 20 40 60 80 100 120 140 160 180

± ±