cellTimeMediumEMBCSlot11 Entries 1948 Mean -0.002005 RMS 0.9841 Underflow 3 Overflow 6 / ndf

2χ 8.383 / 7 Constant 7.8±

226.7 Mean 0.02058 ± 0.05199 Sigma 0.0256 ± 0.6314

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 20 40 60 80 100 120 140 160 180 200 220

± ±