cellTimeMediumEMBCSlot12 Entries 2890 Mean -0.005545 RMS 0.7875 Underflow 0 Overflow 4 / ndf

2χ 10.27 / 7 Constant 8.6± 295 Mean 0.02696 ± -0.07453 Sigma 0.0410 ± 0.8098

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 50 100 150 200 250 300

± ±