cellTimeMediumEMBCSlot12 Entries 2890 Mean -0.01557 RMS 0.6373 Underflow 0 Overflow 4 / ndf

2χ 6.295 / 7 Constant 10.2±

382.7 Mean 0.01486 ± -0.01136 Sigma 0.0172 ± 0.6029

time [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 cells/0.1 ns

0 50 100 150 200 250 300 350 400

± ±